\documentclass[polish,12pt]{aghthesis}
\usepackage{array}
% \documentclass[english,12pt]{aghthesis} dla pracy w jêzyku angielskim. Uwaga, w przypadku strony tytu³owej zmiana jêzyka dotyczy tylko kolejno¶ci wersji jêzykowych tytu³u pracy. 

% Szablon przystosowany jest do druku dwustronnego. 

\usepackage[T1]{fontenc}
\usepackage[utf8]{inputenc}
\usepackage{url}

\author{Mateusz Bielesz, Wojciech Kosior, Marek Moryl, Kamil Szarek}

\titleProject{Weryfikacja poprawności wyników zwracanych przez serwer DNS}

\titleDocument{Koncepcja systemu}

\fieldofstudy{Informatyka}

\supervisor{mgr\ inż.\ Witold Rakoczy}

\date{\the\year}


\begin{document}

\maketitle

\input{wstep}

\input{database}

\newpage

\input{back-end}

\input{front-end}

\end{document}
