\documentclass[polish,12pt]{aghthesis}
% \documentclass[english,12pt]{aghthesis} dla pracy w jêzyku angielskim. Uwaga, w przypadku strony tytu³owej zmiana jêzyka dotyczy tylko kolejno¶ci wersji jêzykowych tytu³u pracy. 

% Szablon przystosowany jest do druku dwustronnego. 

\usepackage[T1]{fontenc}
\usepackage[utf8]{inputenc}
\usepackage{url}

\author{Mateusz Bielesz, Wojciech Kosior, Marek Moryl, Kamil Szarek}

\titleProject{Weryfikacja poprawności wyników zwracanych przez serwery DNS \linebreak dla serwisu klienta}

\titleDocument{Opis problemu\\Wizja rozwiązania}

\fieldofstudy{Informatyka}

\supervisor{mgr\ inż.\ Witold Rakoczy}


\date{\the\year}


\begin{document}

\maketitle

\input{opis_problemu.tex}

\newpage

\input{wizja_rozwiazania.tex}

\end{document}
