From 0346875528dbf94abfea4cf668d34f31f53a3330 Mon Sep 17 00:00:00 2001
From: Wojciech Kosior <kwojtus@protonmail.com>
Date: Fri, 29 May 2020 12:41:26 +0200
Subject: opis systemu

---
 doc/1_opis_problemu/main.tex | 34 ++++++++++++++++++++++++++++++++++
 1 file changed, 34 insertions(+)
 create mode 100644 doc/1_opis_problemu/main.tex

(limited to 'doc/1_opis_problemu/main.tex')

diff --git a/doc/1_opis_problemu/main.tex b/doc/1_opis_problemu/main.tex
new file mode 100644
index 0000000..c3aef45
--- /dev/null
+++ b/doc/1_opis_problemu/main.tex
@@ -0,0 +1,34 @@
+\documentclass[polish,12pt]{aghthesis}
+% \documentclass[english,12pt]{aghthesis} dla pracy w jêzyku angielskim. Uwaga, w przypadku strony tytu³owej zmiana jêzyka dotyczy tylko kolejno¶ci wersji jêzykowych tytu³u pracy. 
+
+% Szablon przystosowany jest do druku dwustronnego. 
+
+\usepackage[T1]{fontenc}
+\usepackage[utf8]{inputenc}
+\usepackage{url}
+
+\author{Mateusz Bielesz, Wojciech Kosior, Marek Moryl, Kamil Szarek}
+
+\titleProject{Weryfikacja poprawności wyników zwracanych przez serwery DNS \linebreak dla serwisu klienta}
+
+\titleDocument{Opis problemu\\Wizja rozwiązania}
+
+\fieldofstudy{Informatyka}
+
+\supervisor{mgr\ inż.\ Witold Rakoczy}
+
+
+\date{\the\year}
+
+
+\begin{document}
+
+\maketitle
+
+\input{opis_problemu.tex}
+
+\newpage
+
+\input{wizja_rozwiazania.tex}
+
+\end{document}
-- 
cgit v1.2.3

